--
-- Tabellenstruktur für Tabelle `TempData`
--

CREATE TABLE `TempData` (
  `TimeStamp` datetime NOT NULL,
  `Nearest5min` datetime NOT NULL,
  `S1_Temp` float DEFAULT NULL,
  `S1_Humidity` float DEFAULT NULL,
  `S2_Temp` float DEFAULT NULL,
  `S2_Humidity` float DEFAULT NULL,
  `S3_Temp` float DEFAULT NULL,
  `S3_Humidity` float DEFAULT NULL,
  `S4_Temp` float DEFAULT NULL,
  `S4_Humidity` float DEFAULT NULL,
  `S5_Temp` float DEFAULT NULL,
  `S5_Humidity` float DEFAULT NULL,
  `S6_Temp` float DEFAULT NULL,
  `S6_Humitiy` float DEFAULT NULL,
  `S7_Temp` float DEFAULT NULL,
  `S7_Humidity` float DEFAULT NULL,
  `S8_Temp` float DEFAULT NULL,
  `S8_Humidity` float DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;

--
-- Indizes der exportierten Tabellen
--

--
-- Indizes für die Tabelle `TempData`
--
ALTER TABLE `TempData`
  ADD UNIQUE KEY `TimeStamp` (`TimeStamp`);
COMMIT;